30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 1.000 Max: 23.000 Mean: 11.606

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN OBSERVATION [M/S] (ALL)

WINDSPEED FROM BTEMP

-1.50

2.50

5.00

7.50

10.00

12.50

15.00

17.50

20.00

22.50

25.00

27.50

30.00

32.50

35.00

37.50

40.00

42.50

45.00

47.50

50.00

52.50

55.00

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 2.000 Max: 29.000 Mean: 11.182

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN OBSERVATION [M/S] (USED)

WINDSPEED FROM BTEMP

-0.50

2.50

5.00

7.50

10.00

12.50

15.00

17.50

20.00

22.50

25.00

27.50

30.00

32.50

35.00

37.50

40.00

42.50

45.00

47.50

50.00

52.50

55.00

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0 Max: 76 Mean: 28.402

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

NUMBER OF OBSERVATIONS PER GRID SQUARE (ALL)

WINDSPEED FROM BTEMP

0 1 2 3 4 6 9 12 16 23 31 43 59 81 111 151 208 284 389 533 730 1000

1368

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0 Max: 15 Mean: 5.867

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

NUMBER OF OBSERVATIONS PER GRID SQUARE (USED)

WINDSPEED FROM BTEMP

0 1 2 3 4 6 9 12 16 23 31 43 59 81 111 151 208 284 389 533 730 1000

1368

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -4.223 Max: 2.809 Mean: 0.037

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN FIRST GUESS DEPARTURE (OBS-FG) [M/S] (ALL)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -4.823 Max: 3.046 Mean: 0.063

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN FIRST GUESS DEPARTURE (OBS-FG) [M/S] (USED)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -3.380 Max: 4.275 Mean: 0.231

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN ANALYSIS DEPARTURE (OBS-AN) [M/S] (ALL)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -5.428 Max: 3.197 Mean: 0.158

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN ANALYSIS DEPARTURE (OBS-AN) [M/S] (USED)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.000 Max: 0.000 Mean: 0.000

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN BIAS CORRECTION [M/S] (ALL)

WINDSPEED FROM BTEMP

-5.50

0.50

1.00

1.50

2.00

2.50

3.00

3.50

4.00

4.50

5.00

5.50

6.00

6.50

7.00

7.50

8.00

8.50

9.00

9.50

10.00

10.50

11.00

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.000 Max: 0.000 Mean: 0.000

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN BIAS CORRECTION [M/S] (USED)

WINDSPEED FROM BTEMP

-5.50

0.50

1.00

1.50

2.00

2.50

3.00

3.50

4.00

4.50

5.00

5.50

6.00

6.50

7.00

7.50

8.00

8.50

9.00

9.50

10.00

10.50

11.00

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -4.223 Max: 2.809 Mean: 0.037

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN BCORR FIRST GUESS DEPARTURE (OBS-FG) [M/S] (ALL)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -4.823 Max: 3.046 Mean: 0.063

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN BCORR FIRST GUESS DEPARTURE (OBS-FG) [M/S] (USED)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -3.380 Max: 4.275 Mean: 0.231

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN BCORR ANALYSIS DEPARTURE (OBS-AN) [M/S] (ALL)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: -5.428 Max: 3.197 Mean: 0.158

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

MEAN BCORR ANALYSIS DEPARTURE (OBS-AN) [M/S] (USED)

WINDSPEED FROM BTEMP

-9.50

-8.50

-7.50

-6.50

-5.50

-4.50

-3.50

-2.50

-1.50

-0.50

0.50

1.50

2.50

3.50

4.50

5.50

6.50

7.50

8.50

9.50

10.50

11.50

12.50

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.236 Max: 10.465 Mean: 4.448

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

STDV OF OBSERVATIONS [M/S] (ALL)

WINDSPEED FROM BTEMP

0.00

0.05

0.10

0.15

0.20

0.25

0.30

0.35

0.40

0.45

0.50

0.55

0.60

0.65

0.70

0.75

0.80

0.85

0.90

0.95

1.00

1.05

10.52

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.471 Max: 10.500 Mean: 3.835

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

STDV OF OBSERVATIONS [M/S] (USED)

WINDSPEED FROM BTEMP

0.00

0.05

0.10

0.15

0.20

0.25

0.30

0.35

0.40

0.45

0.50

0.55

0.60

0.65

0.70

0.75

0.80

0.85

0.90

0.95

1.00

1.05

10.55

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.262 Max: 3.809 Mean: 1.642

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

STDV OF FIRST GUESS DEPARTURE [M/S] (ALL)

WINDSPEED FROM BTEMP

0.00

0.20

0.40

0.60

0.80

1.00

1.20

1.40

1.60

1.80

2.00

2.20

2.40

2.60

2.80

3.00

3.20

3.40

3.60

3.80

4.00

4.20

4.40

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.041 Max: 4.494 Mean: 1.570

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

STDV OF FIRST GUESS DEPARTURE [M/S] (USED)

WINDSPEED FROM BTEMP

-0.16

0.20

0.40

0.60

0.80

1.00

1.20

1.40

1.60

1.80

2.00

2.20

2.40

2.60

2.80

3.00

3.20

3.40

3.60

3.80

4.00

4.20

4.69

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.175 Max: 5.773 Mean: 1.490

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

STDV OF ANALYSIS DEPARTURE [M/S] (ALL)

WINDSPEED FROM BTEMP

-0.02

0.20

0.40

0.60

0.80

1.00

1.20

1.40

1.60

1.80

2.00

2.20

2.40

2.60

2.80

3.00

3.20

3.40

3.60

3.80

4.00

4.20

5.97

30�N

60�N

30�N

60�N

90�W

GRID: 0.50x 0.50

Min: 0.030 Max: 5.806 Mean: 1.265

EXP = 0001, LEVEL = 700.00 - 1013.25 HPA

DATA PERIOD = 2015-01-25 21 - 2015-01-26 09

STDV OF ANALYSIS DEPARTURE [M/S] (USED)

WINDSPEED FROM BTEMP

-0.17

0.20

0.40

0.60

0.80

1.00

1.20

1.40

1.60

1.80

2.00

2.20

2.40

2.60

2.80

3.00

3.20

3.40

3.60

3.80

4.00

4.20

6.01